Table 1: January 1992 VMS Online Documentation Library - Disc 2

Bookshelf

Status Document Name BA42 Expansion Box

BA42 Storage Expansion Box BA42 Installation Guide BA46 Expansion Box BA46 Storage Expansion Box Owner’s Guide DEC CIT Applications Interface for VMS Installation and Con�gurationProgramming Programming Reference CSTA Information DEC CIT Server 100/500 Installation and Con�guration (VMS) Management Problem Solving DEC CIT Server for VMS Installation and Con�guration Management Problem Solving DEC SoftPC for VMS DEC SoftPC User’s Guide DECdecision/Français Decdecision manuel de l’utilisateur DECdecision Calc Macro Guide DECdecision/Nederlands DECdecision Access Gebruikshandleiding DECdecision Calc Gebruikshandleiding DECchart Gebruikshandleiding DECdecision Release notes DECdecision Installation and System Management Guide Converters Reference Guide DECdecision Calc Macro Guide DECdecision/Svenska DECdecision Översikt DECdecision Access Användarhandbok DECdecision Calc Användarhandbok DECchart Användarhandbok DECdecision Builder Användarhandbok DECdecison/Deutsch DECdecision DECdecision Calc Macro Guide DECwrite/Deutsch for VMS DECwrite/Deutsch V1.1 Versionshinweise DECwrite/Deutsch Ergänzungen und neue Funktionen DECwrite/Deutsch Kurzbeschreibung DECwrite/Deutsch Benutzerhandbuch DECwrite/Deutsch zum Nachschlagen DECchart/Deutsch Benutzerhandbuch DECchart/Deutsch Einführung DECwrite Installation Guide for VMS DECwrite Using the DECwrite CDA Converters DECwrite/Francais for VMS L’édition intégrée Mise à jour DECwrite Release Notes1

Table 1 (Cont.): January 1992 VMS Online Documentation Library - Disc 2

Bookshelf Status Document Name

DECwrite Getting Started DECwrite User’s Guide DECchart User’s Guide DECwrite Reference Manual Using the DECwrite CDA Converters DECwrite Installation Guide for VMS Systems DECwrite/Italiano for VMS Introduzione all’uso Guida utente Manuale di riferimento Using the DECwrite CDA Converters DECwrite Installation Guide for VMS Systems Supplemento all documentazione DECwrite Release Notes DECwrite/Nederlands for VMS DECwrite Gebruikshandleiding DECwrite Naslaggids DECchart Gebruikshandleiding DECwrite Release Notes DECwrite VAX/VMS Installation Guide Using the DECwrite CDA Converter DECwrite Supplement DECwrite/Svenska for VMS DECwrite Snabbguide DECwrite Release Notes DECwrite Introduktion DECwrite Användarhandbok DECwrite Referenshandbok DECchart Introduktion DECchart Användarhandbok Using the DECwrite CDA Converters DECwrite Installation Guide for VMS Systems DECwrite Tillägg till dokumentation Digital ANSI-Compliant PPL3 Digital ANSI-Compliant Printing Protocol Level 3 Programming Supplement Digital ANSI-Compliant Printing Protocol Level 3 Programming Reference Manual DRQ3B DMA Parallel Interface Mod- ule DRQ3B DMA Parallel I/O Module Users Guide

KAV30 Documentation KAV30 Hardware Installation and User’s Information KAV30 Software Installation and System Testing Information KAV30 Programmer’s Reference Information Micro/VAX/DRQ3B Device Driver Micro/VAX/DRQ3B Device Driver User’s Guide Small Computer System Interface (SCSI)

VMS SCSI Device Support Manual

Table 1 (Cont.): January 1992 VMS Online Documentation Library - Disc 2

Bookshelf Status Document Name

Small Computer System Interface: An Overview Small Computer System Interface: A Developer’s Guide VAX Disk Striping Driver for VMS VAX Disk Striping Driver for VMS VAX Jukebox Control Software VAX Jukebox Control Software Installation Guide VAX Jukebox Control Software Guide to System Management and Operations VAX Jukebox Control Software Run-Time Library Reference Manual VAXcluster Multi-Datacenter Facil- ity VAXcluster Multi- Datacenter Facility Con�guration Guidelines VAXstation 3100 VAXstation 3100 Model 38 Owner’s Manual VAXstation 3100 Model 48 Owner’s Manual VAXstation 3100 Model 76 Upgrade Guide VAXstation 3100 Model 76 Owner’s Guide Dual Monitor Adapter Installation Guide VMS DECwindows Motif/Dansk VMS DECwindows Motif Beynderbog Introduktion til Bookreader VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Deutsch VMS DECwindows Motif Einführung VMS DECwindows Motif Bookreader VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Deutsch- CH VMS DECwindows Motif Einführung

VMS DECwindows Motif Bookreader VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Espanol Introducción a VMS DECwindows Motif Uso del lector de manuales VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Francais Inititiation á VMS DECwindows Motif Utilisation de l’application Émulivre VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Francais- Canadien

Initiation à VMS DECwindows Motif

Utilisation de l’application Émulivre VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Francais- CH Inititiation á VMS DECwindows Motif

Utilisation de l’application Émulivre VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Italiano Introduzione all’uso di VMS DECwindows Motif Uso di Bookreader VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Italiano-CH Introduzione all’uso di VMS DECwindows Motif

Table 1 (Cont.): January 1992 VMS Online Documentation Library - Disc 2

Bookshelf Status Document Name

Uso di Bookreader VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Nederlands Aan de slag met VMS DECwindows Motif Werken met de Boekerij VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Norsk Innføring i VMS DECwindows Motif Bruke Bokleser-programmet VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Portuguese Guia de Iniciação ao VMS DECwindows Motif Usar o Leitor de Documentação VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Suomi VMS DECwindows Motif Aloittelijan opas Kirjasto-sovelluksen käytö VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows Motif/Svenska Använda VMS DECwindows Motif Använda Bibliotek VMS DECwindows Motif V1.0 Language Variant Installation VMS DECwindows/Canadien-francais VMS DECwindows Nouvelles fonctions VMS DECwindows Manuel d’utilisation VMS DECwindows Guide des applications VMS DECwindows Émulivre VMS DECwindows Notes de mise à jour VMS DECwindows V2.1 Language Variants Installation Guide VMS DECwindows/Deutsch Handbücher

Anleitung zum Bookreader

VMS DECwindows - Neue Funktionen VMS DECwindows - Einführung VMS DECwindows - Benutzerhandbuch VMS DECwindows - Versionshinweise VMS DECwindows - Installation Guide VMS DECwindows/Francais VMS DECwindows/FRANÇAIS - Émulivre Utilisation VMS DECwindows/FRANÇAIS V2.1 - Nouvelles fonctionnalités VMS DECwindows/FRANÇAIS - Manuel d’utilisation VMS DECwindows/FRANÇAIS - Guide des applications VMS DECwindows/FRANÇAIS - Notes de mise à jour VMS DECwindows V2.1 Language Variants Installation Guide VMS DECwindows/Italiano Uso di Bookreader VMS DECwindows/ITALIANO V2.1 Nuove funzionalità VMS DECwindows Applicazioni di base VMS DECwindows Guida utente VMS DECwindow V2.1 Language Variants Installation Guide

Table 1 (Cont.): January 1992 VMS Online Documentation Library - Disc 2

Bookshelf Status Document Name

VMS DECwindows/Nederlands De Boekerij gebruiken VMS DECwindows/Nederlands V2.1 Gebruikshandleiding VMS DECwindows/Nederlands V2.1 Applicaties VMS DECwindows V2.1 Nieuwe functies VMS DECwindows V2.1 Language Variants Installation Guide VMS DECwindows/Svenska Använda Bibliotek VMS DECwindows VMS DECwindows Användarhandbok VMS DECwindows Skrivbordstillbehör VMS DECwindows Version 2.1 Supplement VMS DECwindows/Svenska V2.1 Release Notes VMS DECwindows V2.1 Language Variants Installation Guide WPS�PLUS/ESPAÑOL para VMS Manual de referencia de WPS�PLUS para VMS Printer Characteristics Installation Guide WPS�PLUS/FRANCAIS pour VMS Manuel de Référence Installation Guide Printer Characteristics WPS�PLUS/ITALIANO per VMS WPS�PLUS per VMS Manuale utente Printer Characteristics Installation Guide WPS�PLUS/NEDERLANDS voor VMS WPS�PLUS voor VMS Handboek Printer Characteristics Installation Guide WPS�PLUS/NORSK på VMS WPS�PLUS på VMS Brukerhåndbok Printer Characteristics Installation Guide WPS�PLUS/Svenska för VMS WPS�PLUS för VMS Användarhandbok Printer Characteristics Installation Guide

©Digital Equipment Corp. 1992. All rights reserved.