October, 1990Dear VPA Customer:

We are pleased to provide you with Version 2.1 of the VAX Performance Advisor, VPA. VPA is a knowledge-based performance management and capacity planning tool which helps reduce the time and effort involved in managing, tuning and planning the growth of your VAX/VMS systems.

VPA can be used to monitor daily performance and provide advice when performance problems arise. It will assist you in problem investigation as well as con�rm suspicions which may have previously been too time consuming to substantiate.

VPA also provides useful data for establishing capacity plans to help you predict future resource requirements. Using VPA’s modeling component, you can perform "what-if" analyses for changes in workload and/or con�guration. VPA also provides archiving capabilities for trend analysis.

Thank you for your interest in the VAX Performance Advisor. We look forward to continually offering state-of-the-art performance management and capacity planning products to meet your system management needs.Yours truly,Aireen de Peralta VPA Product Manager1