dt AV�PDS7A�TEBefore You Install DEC RdbAccess for ORACLE on VMS, Version 1.0Dear Customer,Welcome to DEC RdbAccess for ORACLE on VMS, Version 1.0.Read the enclosed Bill of Materials. Check to see that all items listed there are in your kit.

If any items are missing, contact your Digital representative.Be sure that you have VMS Version 5.2 or higher installed on your system.If you are using a workstation, you can use Bookreader to view the Handbook, Installation Guide, and Release Notes.The DEC RdbAccess for ORACLE on VMS Release Notes contain descriptions of restrictions or problems discovered too late in the engineering process to be corrected. An online text �le located in SYS$HELP:VIDAO$010.RELEASE_NOTES contains the most recent release notes.For information on installing DEC RdbAccess for ORACLE on VMS, please consult the DEC RdbAccess for ORACLE on VMS Installation Guide.You can use RdbAccess without being logged in on the same VAX processor that has RdbAccess installed. You can be on any other VAX/VMS system in the Digital network that has Rdb/VMS installed to access a node that has RdbAccess installed. This is called remote end user access.However, RdbAccess must be installed on the node that also has the ORACLE RDBMS installed, but the ORACLE database can be on a remote system. If you are using a system that has both RdbAccess and ORACLE installed, you can use remote ORACLE database access to access an ORACLE database on another system.' Digital Equipment Corporation. 1990. All rights reserved.