F F

Software

Product

Description

FPRODUCT NAME:

FVIDA

forDB2

F�,Version

1.0SPD25.E7.00

FDESCRIPTION Features

F�VIDA for DB2 provides direct database access to IBM-

VIDA for DB2

F� is an interoperability product which permits

based DB2 tables and views. The user application acaccess to DB2 databases resident on IBM

F� mainframe

cesses DB2 data the same way it would access Rdb/ systems. VIDA for DB2 provides read access to DB2 data-

VMS data.

bases from VAX-based applications using the read-only subset of the DIGITAL Standard Relational Interface (DSRI)

F�VIDA for DB2 does not require users to create a copy of

architecture. VIDA for DB2 users can access IBM-resident the IBM database on a VAX system. Creating VAX-

DB2 data using products such as VAX DATATRIEVE and resident extracts of IBM data is a matter of user prefer-

VAX TEAMDATA, the VAX Rdb/VMS utilities including interence and convenience.

active SQL and RDO, and VAX Data Distributor, as well as

F�Applications can be developed to retrieve data directly

applications with embedded SQL or Data Manipulation from the DB2 database. Data retrieved from the main-

Language (DML).

frame database can be displayed at a user’s terminal, printed, or copied to VAX Rdb/VMS and VAX DBMS

VIDA for DB2 is engineered using a client/server architecdatabases or to VAX RMS files.

ture. It consists of two component products and uses

DIGITAL’s SNA interconnect products. VIDA Client for DB2

F�VIDA for DB2 supports a number of DSRI-compliant user

(hereafter referred to as VIDA Client) is a VAX-resident interfaces.

product that processes DSRI requests. VIDA Client uses the

F�DB2 data can be accessed interactively using VAX Rdb/

DECnet/SNA VMS APPC/LU6.2 Programming Interface to

VMS interactive SQL or RDO.

send the requests through a DECnet/SNA Gateway or VMS/

SNA (hereafter referred to as a gateway) to an IBM main-

F�DB2 data can be extracted and stored in Rdb/VMS

frame. VIDA Server for DB2 (hereafter referred to as VIDA tables using VAX Data Distributor.

Server) is an IBM-resident product which accepts the LU6.2

F�DB2 data can be accessed directly from third generation

messages and submits the requests to DB2. Data obtained language (3GL) programs using embedded VAX Rdb/ from DB2 is passed back to VIDA Client through the gate-

VMS SQL, SQL module language, dynamic SQL, callway, and VIDA Client returns the data to the requesting able RDO, or VAX Data Manipulation Language (DML).

application. The application can use the accessed data as it

These data access sublanguages are the same sublangwould any locally accessed data. For example, the data can uages used to access VAX Rdb/VMS data tables and be stored in a VAX database or VAX RMS file, or it could be views. The VAX Rdb/VMS development option is redisplayed on a screen or printed.

quired to develop 3GL applications that use VIDA for

DB2. VAX Rdb/VMS provides SQL pre-compiler support

VIDA Client runs under VMS on VAX, MicroVAX, and for languages such as Ada, C, COBOL, FORTRAN, and

VAXstation systems. VIDA Server runs as a CICS/OS/VS

PL/I. VAX Rdb/VMS provides DML pre-compiler support transaction on IBM System/370 mainframe systems running for languages such as COBOL, C, BASIC, FORTRAN, the IBM MVS/XA

F� Operating System.

and PASCAL. SQL module language or callable RDO can be used with any language that supports the VMS calling standard. Reference VAX Rdb/VMS (SPD

25.59.xx) for a complete description of programming language support.

F�When VIDA for DB2 is used with VAX DATATRIEVE,

users can generate DATATRIEVE queries and reports that include data from DB2 tables or views.

F__________________

F� DB2 is a trademark of the International Business Machines Corporation.

F� IBM is a registered trademark of the International Business Machines Corporation.

F� MVS/XA is a trademark of the International Business Machines Corporation.

FJune

1989

AE-MH79A-TE

FVIDA forDB2

F�,Version

1.0SPD25.E7.00

F�When VIDA for DB2 is used with VAX TEAMDATA, end

FINSTALLATION

Fusers can access DB2 data tables and views directly,

Both VIDA Server and VIDA Client need to be installed to join them with TEAMDATA tables, store the results in provide access to DB2. Due to the complexities of installing

TEAMDATA folders, etc. for use in decision support and software on both IBM and VAX machines and of ensuring other personal and departmental applications.

proper communications between the Client and Server,

F�VIDA Client accepts a DSRI request from a user applica-

DIGITAL will provide advisory service for the installation of tion. VIDA Client converts the request into DB2 SQL and the VIDA Server product. The installation advisory service sends the request to VIDA Server on the target IBM package is included in the VIDA Server for DB2 license.

system. The request is sent through a gateway using the

FHARDWARE REQUIREMENTS

FDECnet/SNA VMS APPC/LU6.2 Programming Interface.

FVIDA Client for DB2

F:F�VIDA Server accepts the SQL request from VIDA Client

and submits it to DB2 using the dynamic SQL interface.

VAX, MicroVAX, or VAXstation configuration as specified in

The results of the request are passed back through the the System Support Addendum (SSA 25.E7.00-x).

gateway to VIDA Client.

FVIDA Server for DB2

F:F�VIDA Client performs automatic EBCDIC/ASCII transla-

tion and passes the results to the calling program.

IBM S/370 configuration as specified in the System Support

EBCDIC/ASCII translation is performed using a default

Addendum (SSA 25.E7.00-x).

translation table. An alternate user defined translation table can be used if the default is not appropriate.

FSOFTWARE REQUIREMENTS

F*F�VIDA Server runs as a CICS transaction. Sites can apply

FVAX Software

F:CICS tuning techniques to the VIDA Server CICS transaction just as they can to other CICS transactions.

VMS Operating System

DECnet/SNA VMS APPC/LU6.2 Programming Interface

F�VIDA Server works in conjunction with existing security

products in IBM environments, for example ACF2

F� ,FIBM Software

F:RACF, and default CICS security. VIDA users require an

MVS/XA Operating System

IBM account and must be properly authorized within

CICS/OS/VS

CICS and DB2 to access DB2 data. DB2 F�VIDA Server uses a view to retrieve metadata from the

DB2 Attachment Facility for CICS/OS/VS

DB2 catalog. The view can be redirected at installation

SMP/E time to access user defined data tables which contain

Assembler H catalog data. The metadata is automatically passed to

VIDA Client which converts the definitions into DIGITAL

*Refer to the System Support Addendum (SSA 25.E7.00- relational data definitions.

x) for availability and required versions of prerequisite/ optional software.

F�The DIGITAL relational data definitions created by VIDA

Client can be stored in CDD/Plus using RDO or SQL

FORDERING INFORMATION

FINTEGRATE commands. 3GL programs can be com-

piled against data definitions in CDD/Plus.

The VIDA for DB2 components are ordered separately. An installation advisory service package and on-site user orien-

F�VIDA for DB2 uses DIGITAL’s SNA interconnect soft-

tation program is included with the VIDA Server for DB2 ware and hardware, including the DECnet/SNA license.

Gateways, VMS/SNA, and the DECnet/SNA VMS APPC/

LU6.2 Programming Interface to make the VAX to IBM

VIDA Server is available only on 6250 BPI Magtape media.

communications link.

VIDA Client is available on 1600 BPI Magtape or TK50 media. TK50 devices are required for VAXstation 2000 and

F�VIDA for DB2 uses LU6.2 communications protocols to

MicroVAX 2000 systems.

achieve fast and efficient data transfer.

FSoftware Licenses:

F�VIDA Client on one VMS system can provide DB2 data

access to local or remote users in the same DECnet

VIDA Client: QL-VTWA*-** network provided that users on the remote systems have

VIDA Server: QB-VTXA9-BA access to some other DSRI database product with remote capabilities.

FSoftware Media:

F�VIDA for DB2 provides a logging facility that can trace

VIDA Client: QA-VTWA*-** communications activity, log errors, and help isolate

VIDA Server: QA-VTXAA-*A problems.

FSoftware Documentation:

FLimitations

FVIDA Client: QA-VTWAA-GZ

VIDA for DB2 provides read-only access.

VIDA Server: QA-VTXAA-GZ

F__________________

F� ACF2 is a trademark of the Computer Associates International Corporation. F2 FVIDA forDB2

F�,Version

1.0SPD25.E7.00

FSoftware Product Services:

FFor more information on the License Management Facility,

refer to the VMS Operating System Software Product

VIDA Client: QT-VTWA*-**

Description (SPD 25.01.xx) or the License Management

VIDA Server: QT-VTXA*-**

Facility manual of the VMS Operating System documentation set.

*Denotes variant fields. For additional information on available licenses, services and media refer to the appro-

For more information about DIGITAL’s licensing terms and priate price book.

policies, contact your local DIGITAL office.

FSOFTWARE LICENSING

SOFTWARE PRODUCT SERVICES

FThis software is furnished under the licensing provisions of

VIDA for DB2 is a part of a database interconnect solution

DIGITAL’s Standard Terms and Conditions. For more inforinvolving database, networking, decision support and IBM mation about DIGITAL’s licensing terms and policies, consoftware. It is required that a support contract be purchased tact your local DIGITAL office.

with the VIDA Server license.

FLICENSE MANAGEMENT FACILITY

FA variety of service options are available from DIGITAL. For

more information contact your local DIGITAL office.

The VIDA Client for DB2 layered product supports the VMS

License Management Facility. The License Management

FSOFTWARE WARRANTY

FFacility does not apply to the VIDA Server for DB2 product.

Warranty for this software product is provided by DIGITAL

License units for the VIDA Client product are allocated on a with the purchase of a license for the product as defined in

CPU-capacity basis.

the Software Warranty Addendum of this SPD. F3