<DECLOGO>VAXcluster CONSOLE SYSTEM VERSION 1.3 COVER LETTER AV�HW78C�TEDear VCS Customer:

We are pleased to provide you with Version 1.3 of the VAXcluster Console System (VCS). VCS is a system management tool that provides a central point of control for all system-wide console functions, eliminating the need for redundant console terminals. VCS V1.3 is a VMS Version 5.3 DECwindows layered software product, and utilizes MicroVAX and VAXstation systems as host hardware platforms.

VCS manages stand-alone VAXes, VAXcluster systems, or any device that sends ASCII data over an RS-232C line, and support XON/XOFF and I/O buffering. Hence, PDP-11 processors, line printer servers or controllers, LAN Bridges, and other third-party devices that meet those requirements can be monitored from by VCS from one central location.

VCS is installed using the VMSINSTAL procedure. Please refer to Chapter 2 of the VCS Software Manual for the installation procedure.

Thank you for your interest in the VAXcluster Console System. We look forward to continually offering state-of-the-art software products to meet your system management needs.Regards, Aireen de Peralta VAXcluster Console System Product Manager

' Digital Equipment Corporation. 1990. All rights reserved.1