dtCUSTOMER LETTER OF NOTIFICATION

AV�PG5CA�TE January 7, 1991Dear VMS/ULTRIX Connection Customer, Digital Engineering has recently discovered a problem in Version 1.3A of the VMS/ULTRIX Connection that relates to �le access control. To improve your system’s security, we strongly recommend that you perform the following steps immediately. Please follow these instructions carefully in order to properly implement the recommended correction. 1. Modify UCX$FTPD_STARTUP.COM so that UCX$FTPC.EXE installs with OPER privilege instead of SYSPRV. Do this by changing the following DCL program statement in UCX$FTPD_STARTUP.COM:

$ IF .NOT. F$FILE("’’LIBRARY’","KNOWN") -
   THEN INSTALL CREATE ’LIBRARY’/HEADER/SHARED-
   /PRIVILEGED=(SYSPRV,NETMBX)

Change the third line so that the /PRIVILEGED quali�er is set to OPER, as follows:

$ IF .NOT. F$FILE("’’LIBRARY’","KNOWN") -
   THEN INSTALL CREATE ’LIBRARY’/HEADER/SHARED-
   /PRIVILEGED=(OPER,NETMBX)

2. Shut down FTP with the following command:

$ @SYS$MANAGER:UCX$FTPD_SHUTDOWN

3. Start up FTP with the following command:

$ @SYS$MANAGER:UCX$FTPD_STARTUPWe apologize for any inconvenience these extra steps will cause you. If you have any further questions regarding this letter, please contact your Customer Support Center.The following are trademarks of Digital Equipment Corporation: VMS, ULTRIX, VMS/ULTRIX Connection. 'Digital Equipment Corporation. 1991. All rights reserved.