AV-U281J-TE

DATE: November 20, 1989

Dear VAX SPM Customer;

DIGITAL is pleased to announce version 3.4 of the VAX Software Performance Monitor (VAX SPM). VAX SPM version 3.4 is a maintenance release and as such, contains no signi�cant new functionality.

The version 3.4 changes include software �xes to correct visible problems and other �xes to increase system integrity that are not especially visible to users. Most of the changes involved improvements to VAX SPM’s performance when utilizing many of the new features that were provided with the previous version (v3.3), especially the Bottleneck Analyzer component. With this release, VAX SPM also supports most of our newly announced VAX Systems.

It is important that you take the time to read the VAX SPM Installation Guide and VAX SPM Release Notes prior to installing and using the new software. Important information on using the VAX SPM software is contained in these documents as well as descriptions of problems resolved by VAX SPM version 3.4.Sincerely,VAX SPM Product Management

Copyright (C) Digital Equipment Corporation. 1989. All Rights Reserved.