CopyrightW 1991 by Digital Equipment Corporation w All rights reserved w Printed in U.S.A.

DECnet/SNA Gateway–CT, Version 2.1

(For ULTRIX)

A V–PHKQA–TE

July 1991

Dear Customer:

Please take a few moments to read the following information concerning your DECnet/SNA

Gateway–CT Version 2.1 distribution kit.

This package contains the DECnet/SNA Gateway–CT Version 2.1 software and user documentation.

Please check the Bill of Materials to see that all items listed are in your distribution kit. If any item is missing or damaged, contact your Digital representative.

The DECnet/SNA Gateway–CT Version 2.1 documentation set includes the following:

w DECnet/SNA Gateway–CT Installation (ULTRIX) (AA–PHKZA–TE) w DECnet/SNA Gateway–CT Guide to IBM Parameters (AA–LU36C–TE) w DECnet/SNA Gateway–CT Problem Solving (VMS and ULTRIX) (AA–LU37C–TE) w DECnet/SNA Gateway–CT and Gateway–ST Management (ULTRIX) (AA–PHL9A–TE)

If you need to order any additional documentation, contact your Digital sales representative, or refer to the ordering information in the Softwar e Documentation Products Directory .

Y our online documentation includes the DECnet/SNA Gateway–CT release notes for V ersion 2.1 as part of the distribution kit. These release notes contain additional information about the Gateway–CT software and documentation. Digital recommends that you read the release notes before using Gateway–CT.

The release notes are part of the Gateway–CT base software subset: CTVBASE210 (for VAX/UL TRIX) or CTRBASE210 (for RISC/ULTRIX). The installation procedure stores the release notes in this file:

/usr/lib/snagwy/snacsa210.release_notes

Digital prides itself on responding to customer needs. In order to continue serving you, we need your comments. Each manual contains a preaddressed, postage–paid Reader ’ s Comment form at the back. If you find errors in a manual or want to make comments, please complete and return this form.