DECmcc Site Management Station Version 2.1 dt AV-PHOXA-TE May 1991 Dear Customer:Please take a few moments to read the following information concerning your DECmcc

Site Management Station Version 2.1 distribution kit.Changes from Previous Version DECmcc Basic Management System V1.1 and Terminal Server Manager V1.4 are new releases. Refer to the appropriate use guide for information on the changes from the previous version. DECelms V1.1 is a maintenance release. Refer to the online release notes for a list of changes from V1.0.VAX DNS Is a Prerequisite VAX Distributed Name Service V1.1 is a prerequisite for the DECmcc Basic Management System V1.1. If you do not already have the VAX Distributed Name Service V1.1 server in your network, you can obtain a loan of this software anywhere in the world by contacting your Digital Sales Representative and signing a Loan of Software Agreement.Release Notes The Site Management Station release notes for V2.1 are online as part of the distribution kit. You can access the release notes as part of the installation procedure by specifying OPTIONS N when you invoke VMSINSTAL:

$ @SYSUPDATE:VMSINSTAL kit_name ddcu: OPTIONS NIf you use OPTIONS N with VMSINSTAL, you are asked whether you want the release notes displayed, printed (or both), copied to SYS$HELP, or none of these options. You can type or print the �le SYS$HELP::kit_name.RELEASE_NOTES after installation.Documentation The DECmcc Management Station Installation and Use guides have been updated to re�ect the new releases of DECmcc Basic Management System (BMS), Terminal Server Manager (TSM), and DEC Extended LAN Management Software (DECelms).The DECmcc Management Station documentation set includes all of the DECmcc Basic Management System V1.1 documentation except for DECmcc Installation. All installation procedures for DECmcc Management Station and its supported applications are documented in DECmcc Management Station Installation.Copyright '1991 by Digital Equipment Corporation � All rights reserved � Printed in U.S.A.