F F

Software

Product

Description

FPRODUCT NAME:

FVAXELN

KMV1A

Tool

Kit,Version

1.1SPD29.17.01

FDESCRIPTION

Foperator interface on an Ethernetted VAX/VMS

system through Ethernetted MicroVAX to KMV1A.

The VAXELN KMV1A Tool Kit is designed to allow the

-KMV1A Debug Service Module executes in KMV1A development of KMV1A control programs for KMV1As in to provide ODT-type debugging. The Debug Service

MicroVAX VAXELN systems. This package includes soft-

Module may be Linked into KMV1A control program ware that is used to create KMV1A control program or loaded into KMV1A independently.

images on a VAX host system, VAXELN KMV1A Load and Dump Programs, and a KMV1A network Debug

FHARDWARE REQUIREMENTS

Fpackage that allows the testing and debugging of KMV1A

VAX or MicroVAX configuration as specified in the control programs from a VAX host system.

System Support Addendum (SSA 29.17.01-x).

The VAXELN KMV1A Tool Kit is designed to operate with

FSOFTWARE REQUIREMENTS *

Fthe VAXELN Toolkit and the VMS RSX Emulation prod-

ucts.FFor VAX Development Systems:

FVMS Operating System

FFeatures

FFor MicroVAX II Development Systems:

F�Automated KMV1A control program image generation

VMS Operating System

F�VAXELN KMV1A Load Program

*Refer to the System Support Addendum for availability

-Load KMV1A control programs from local or network and required versions prerequisite/optional software mass storage

(SSA 29.17.01-x).

FORDERING INFORMATION

F-Load KMV1A Debugger into KMV1A

Software Licenses: QL-0JPA*-**

-Optionally Master Clear KMV1A

Software Media: QA-0JPA*-**

Software Documentation: QA-0JPAA-GZ

F�VAXELN KMV1A Dump Program

Software Product Services: QT-0JPA*-**

-Application program commands stopping and dump-

*Denotes variant fields. For additional information on ing of KMV1A for real-time snapshot of KMV1A state available licenses, services and media, refer to the appropriate price book.

-KMV1A dump stored on local or network mass storage

FSOFTWARE LICENSING

F-KMV1A dump examined with standard VMS Dump/

FFor Target Systems:

FAnalyze Program

An appropriate VAXELN license is required.

F�Remote Debug

This software is furnished under the licensing provisions of DIGITAL’s Standard Terms and Conditions. For more

-Network Debugging - The host VAX must have an information about DIGITAL’s licensing terms and policies,

Ethernet connection to MicroVAX with KMV1A incontact your local DIGITAL office.

stalled. Debug strategy follows VAXELN Network

Debug model.

FLICENSE MANAGEMENT FACILITY SUPPORT

F-Operator interface program that executes on VAX/

This layered product supports the VMS License

VMS host system.

Management Facility.

-VAXELN Debug Server Program that operates a

License units for this product are allocated on a per CPU communications channel through MicroVAX in which basis and are not dependent on CPU Capacity or User/

KMV1A is installed. The Debug Server connects an

Activity.

FSeptember

1989

AE-KT54B-TK

FVAXELN KMV1A

Tool

Kit,Version

1.1SPD29.17.01

FFor more information on the License Management

For more information contact your local DIGITAL office.

Facility, refer to the VMS Operation System Software

FSOFTWARE WARRANTY

FProduct Description (SPD 25.01.xx) or the License

Management Facility manual of the VMS Operating

Warranty for this software product is provided by

System documentation set.

DIGITAL with the purchase of a license for the product as defined in the Software Warranty Addendum of this SPD.

For more information about DIGITAL’s licensing terms and policies, contact your local DIGITAL office.

FSOFTWARE PRODUCT SERVICES

FA variety of service options are available from DIGITAL. F2