DECelms (DEC Extended LAN Management Software) Version 1.0 dt AV-PAXDA-TE June 1990 Dear Customer:This letter contains important information that will help you understand and use

DECelms (DEC Extended LAN Management Software) Version 1.0.New Product Features DECelms V1.0 is a replacement product for Remote Bridge Management Software V2.0 (RBMS V2.0). DECelms V1.0 manages extended LANs comprised of Ethernet/IEEE 802.3 segments and FDDI rings by providing support for the new DECconcentrator 500 and DECbridge 500. It continues to support Digital’s Ethernet/ IEEE 802.3 bridges: the LAN Bridge 100, LAN Bridge 150, and LAN Bridge 200. DECelms also displays SMT information for FDDI stations.Customers whose extended LANs currently contain only Ethernet/IEEE 802.3 segments will appreciate the many functional and ease-of-use enhancements in DECelms. These enhancements include a streamlined command interface, a new display interface, an autocon�guring device registry, event messages, and an event log.Installation into DECmcc SMS or DECmcc EMS The DECelms installation dialog contains a new prompt about installing DECelms into DECmcc Site Management Station (SMS) or DECmcc Enterprise Management Station (EMS). This prompt is not described in the DECelms Installation guide, but it is fully described in the release notes. Answer YES to install DECelms into DECmcc SMS or DECmcc EMS, replacing RBMS. Answer NO to install DECelms separately.Release Notes Please read the on-line release notes for more information about DECelms V1.0. To read the release notes, specify OPTIONS N when installing DECelms (see the DECelms Installation guide, Chapter 2.)Documentation The DECelms Installation guide explains how to prepare your system, install DECelms, and verify the installation. The DECelms Use manual describes how to perform management tasks with DECelms. The DECelms Reference guide provides reference information on the DECelms commands. The Fiber Distributed Data Interface System Level Description describes the FDDI standard, Digital’s implementation, and the operation of FDDI bridges and wiring concentrators. The Bridge and Extended LAN Reference provides conceptual information on bridge operation.Copyright '1990 by Digital Equipment Corporation � All rights reserved � Printed in U.S.A.