F F

Software

Product

Description

FPRODUCT NAME:

FPDP-11

DATATRIEVE/VAX,

SPD25.14.18

Version 3.3

FDESCRIPTION

FDATATRIEVE/VAX uses simple English language-like

commands for data retrieval, modification, and display.

PDP-11 DATATRIEVE/VAX is an interactive query,

Prompting is automatic for both command and data entry.

report, and data maintenance system designed for the

The major commands are as follows:

less sophisticated computer user. DATATRIEVE/VAX runs under the VMS Operating System in conjunction

F�HELP provides a summary of each DATATRIEVE

with VAX-11 RSX. DATATRIEVE/VAX utilizes the RMS command.

(Record Management Services) to access data contained in disk files of sequential, indexed, or relative organiza-

F�READY identifies a domain for processing and con-

tion. DATATRIEVE/VAX provides facilities for selective trols the access mode to the appropriate file.

data retrieval, sorting, formatting, updating, and report

F�FIND establishes a collection (subset) of records con-

generation without the need for programming.

tained in either a domain or a previously established

Record and domain (file) definitions entered in collection based on a Boolean expression.

DATATRIEVE/VAX are stored in Data Dictionaries

F�SORT reorders a collection of records in either an

shared by DATATRIEVE/VAX users. Dictionaries can ascending or descending sequence based upon the also be used to store frequently used sequences of comcontents of one or more fields in those records.

mands to be recalled and processed later. Commands are provided to list the contents of the Data Dictionary, to

F�PRINT prints one or more fields of one or more

delete entries, and to control access to individual entries records. Output can be optionally directed to a line in the Data Dictionary. A Dictionary Compression utility is printer or disk file. Format control can be specified. A provided to compress the Data Dictionary index file.

column header is generated automatically.

DATATRIEVE/VAX enables the user to define domains

F�SELECT identifies a single record in a collection for

that cross RMS file definitions and subset record definisubsequent individual processing.

tions.

F�MODIFY alters the values of one or more fields for

DATATRIEVE/VAX provides an Application Design Tool either the selected record or all records in a collection.

(ADT) to assist the novice user in creating domain and

Replacement values are prompted for by name.

record definitions. The ADT uses an interactive dialogue technique to guide the user through the data definition

F�STORE creates a new record. The value for each field

process. It creates an indirect command file that is then contained in the record is prompted for by name.

processed to actually update the DATATRIEVE/VAX

Data Dictionary.

F�ERASE removes one or more records corresponding

to the appropriate domain.

The DATATRIEVE/VAX report writer provides easy-to-use commands to control the following report functions:

F�FOR executes a subsequent command once for each

record in a collection providing a simple looping

F�Report name, date, and page numbering

facility.

F�Page width and length specification

F�EDIT invokes an editor (EDT) that inserts, replaces, or

F�Detail line specification

deletes text from procedures defined in the Data

Dictionary.

F�Multiple control break specification with automatic to-

taling at any level

F�DROP allows the user to drop selected records from a

collection.

F�Multiple report sections

DATATRIEVE/VAX report commands can be freely inter-

F�DECLARE defines global and local variables to be

mixed with other DATATRIEVE/VAX commands.

used within a DATATRIEVE query.

FJuly1989

AE-H113S-TE

FPDP-11 DATATRIEVE/VAX,

SPD25.14.18

Version 3.3

F�DEFINE provides a consistent mechanism for creating

DATATRIEVE/VAX provides data encoding, decoding domain, record, procedure, table, and view definitions and input validation capabilities through tables stored in in the Data Dictionary.

the Data Dictionary. The user can also check data validity by storing validation criteria in the record definition.

F�REDEFINE - Functions similarly to DEFINE, but an

implicit delete is performed on the previous version of

FSOURCE CODE INFORMATION

Fthe dictionary object.

The following source code modules are provided on all

DATATRIEVE/VAX provides lexical functions consisting magnetic distribution media:

of the following four groups:

F�MESSAGE TEXT

F�Functions using numeric data:

F�DATATRIEVE DICTIONARY

-FN$ABS - Calculates absolute value of input

F�OBJECT DEFINITION

-FN$MOD - Calculates value of input according to

-DOMAINS specified modulus

-RECORDS

-FN$SIGN - Indicates the sign of a number

-PROCEDURES

-TABLES

F�Functions using alphanumeric data:

FHARDWARE REQUIREMENTS

F-FN$STR__EXTRACT - Extracts substring from input using a default edit string of 30 characters.

VAX configuration as specified in the System Support

Addendum (SSA 25.14.18-x).

-FN$STR__LOC - Calculates starting position of substring in input

FSOFTWARE REQUIREMENTS*

F-FN$UPCASE - Changes characters in string to

VMS Operating System uppercase

VAX-11 RSX

F�Functions using dates:

*Refer to the System Support Addendum (SSA

-FN$JULIAN - Calculates Julian date of input

25.14.18-x) for availability and required versions of

-FN$YEAR - Extracts year part of input prerequisite/optional software.

-FN$MONTH - Extracts month part of input

FORDERING INFORMATION

F-FN$DAY - Extracts day part of input

Software Licenses: QL-105A*-**

Software Media: QA-105A*-**

-FN$TIME - Extracts time part of input

Software Documentation: QA-105AA-GZ

-FN$HOUR - Extracts hour part of input

Software Product Services: QT-105A*-**

-FN$MINUTE - Extracts minute part of input

*Denotes variant fields. For additional information on available licenses, services and media, refer to the

-FN$SECOND - Extracts second part of input appropriate price book.

-FN$HUNDREDTH - Extracts hundredth-of-a-second

FSOFTWARE LICENSING

Fpart of input

-FN$DATE - Converts a date string to an 8-byte data

This software is furnished under the licensing provisions value of DIGITAL’s Standard Terms and Conditions. For more information about DIGITAL’s licensing terms and policies,

F�Function relating to processes:

contact your local DIGITAL office.

-FN$DCL - Allows you to spawn directly from your

FLICENSE MANAGEMENT FACILITY

Fmain DATATRIEVE process to a specified Digital

Command Language (DCL) command.

This layered product supports the VMS License

Management Facility.

In addition to the simple data manipulation commands, a number of more complex commands are available for the

License units for this product are allocated on a CPUadvanced user. These commands, such as REPEAT, capacity basis.

BEGIN-END, and IF-THEN-ELSE, can be used to com-

For more information on the License Management bine two or more DATATRIEVE/VAX commands into a

Facility, refer to the VMS Operating System Software single compound command. These, in turn, can be stored

Product Description (SPD 25.01.xx) or the License in the Data Dictionary as procedures for invocation by

Management Facility Manual of the VMS Operating less experienced users.

System documentation set.

DATATRIEVE/VAX provides a full set of arithmetic opera-

For more information about DIGITAL’s licensing terms tors (addition, subtraction, multiplication, division, and neand policies, contact your local DIGITAL office.

gation) and a set of statistical operators (total, average, maximum, minimum, and count), and provides data types

FSOFTWARE PRODUCT SERVICES

Fused in the FORTRAN, COBOL, DIBOL, and BASIC-

PLUS-2 languages. An additional data type is provided

A variety of service options are available from DIGITAL.

that supports time and recognizes various date formats.

For more information contact your local DIGITAL office. F2 FPDP-11 DATATRIEVE/VAX,

SPD25.14.18

Version 3.3

SOFTWARE WARRANTY

FDIGITAL with the purchase of a license for the product as

defined in the Software Warranty Addendum of this SPD.

Warranty for this software product is provided by F3