VAX Distributed Queuing Service Version 1.2

AV-MA45B-TE May 1991

Dear Customer:

This letter contains important information to help you understand and use the VAX Distributed Queuing Service (DQS) Version 1.2 and its documentation. Product Features DQS Version 1.2 now supports VMS Versions 5.3 and 5.4. Documentation VAX Distributed Queuing Service Management Guide, VAX Distributed Queuing Service User’s Guide, and VAX Distributed Queuing Service Command Reference manual remain unchanged from the Version 1.1 release. References in these manuals to DQS Version 1.1 also apply to DQS Version 1.2. Keep all DQS Version 1.1 documentation.

Some changes have been made to the installation procedure for DQS Version 1.2. These are documented in the release notes. The VAX Distributed Queuing Service Installation Guide has not been updated for DQS Version 1.2. Release Notes Please read the on-line DQS Version 1.2 release notes for more information about the content and function of the DQS Version 1.2 product. To read the on-line release notes, specify the OPTIONS N option when installing DQS. Instructions for accessing the release notes are in Chapter 2 of the VAX Distributed Queuing Service Installation Guide.

© Digital Equipment Corporation 1988, 1991. All rights reserved.