F F

Software

Product

Description

FPRODUCT NAME:

FVAX

DIBOL,

Version

4.1SPD25.49.14

FDESCRIPTION

FVAX DIBOL also includes a menu facility, support for

long file names (up to 39 characters in the ‘‘name’’ por-

VAX DIBOL is a high-level procedural language designed tion of the filespec) and an ISMCRE subroutine which specifically for interactive business data processing. It allows creation of RMS indexed files under DIBOL proruns under the VMS Operating System, taking full advangram control.

tage of the system facilities.

The VAX DIBOL compiler generates debug records for

VAX DIBOL is a superset of the DIBOL-83 definition.

use with the VAX Symbolic Debugger, including support

VAX DIBOL is highly compatible with DIBOL implementafor source line debugging.

tion on other operating systems including CTS-300,

FDIBOL Language Description

FRSTS/E, Micro/RSTS, RSX-11M-PLUS, Micro/RSX.

A DIBOL program is separated into two major parts: a

VAX DIBOL includes support for several tools and utilities

Data Division and a Procedure Division. The Data on VMS including the VAX Language-Sensitive Editor,

Division defines the data that is used by the program.

VAX Debugger, and the VAX Performance Coverage

The Procedure Division contains the executable

Analyzer.

statements.

VAX DIBOL also includes support for the current

The first element in most DIBOL statements is an English

American National Standard for DIBOL, as well as the language verb that characterizes the action to be per-

1988 ANSI DIBOL Standard, X3.165-1988.

formed. The other elements of the statement are data

VAX DIBOL provides efficient terminal handling and efnames, references to statement labels, and/or exficient access to the VAX Record Management Services pressions. DIBOL statements fall into the following

(RMS). RMS provides access to sequential, relative and categories:

indexed file organizations. The .INCLUDE directive allows access to common record definitions stored in the VAX

F�Compiler Directives - Provide information about the pro-

Common Data Dictionary (CDD). Other facilities such as gram to the compiler

VAX DATATRIEVE, VAX DBMS, VAX FMS and VMS

Run-Time Library routines are available as external sub-

F�Compiler Declarations - Provide information about the

routine calls.

program structure to the compiler

VAX DIBOL supports a set of language statements com-

F�Data Specification Statements - Define the data used in

monly referred to as structured constructs. These statethe program ments are designed to complement and facilitate

F�Data Manipulation Statements - Perform conversions

desirable programming practices.

and value assignments

The DIBOL compiler reads a source program and pro-

F�Control Statements - Modify the order of statement

duces a shareable object module. The compiler is capaexecution ble of producing a source listing with embedded diagnostics and a cross reference listing. Object modules

F�Intertask Communications Statements - Allow communi-

produced by the compiler conform to the VAX Procedure cation between programs

Calling Standard and may be linked with native mode object modules produced by other VAX language

F�Input/Output Statements - Move data between memory

processors.

and I/O devices

The VAX DIBOL product includes a compiler, a run-time

FUniversal External Subroutine Library

Flibrary, external subroutine libraries, a message manager

for communicating between programs, a program to

This library contains external subroutines which are availmonitor the activities of the message manager, and proable and perform similar functions on all DIBOL grams that provide access to the VAX SORT using comimplementations.

mand files that are compatible with other DIBOL products.

FOperating System-Specific Library

FMarch

1990

AE-M383P-TE dt FVAX DIBOL,

Version

4.1SPD25.49.14

FThis library contains external subroutines which are avail-

*Denotes variant fields. For additional information on able and perform similar functions on one or more of the available licenses, services and media, refer to the ap-

DIBOL implementations. With VAX DIBOL, the library inpropriate price book.

cludes routines to perform functions such as position the

FSOFTWARE LICENSING

Ffile pointer within a file, mounting/dismounting disk and

tape units, and locking the program into memory.

The software is furnished under the licensing provisions of Digital Equipment Corporation’s Standard Terms and

FRun-Time Subroutine Library

FConditions.

This library contains external subroutines which are avail-

For more information about Digital’s licensing terms and able only with VAX DIBOL and provide functions which policies, contact your local Digital office.

are unique to VAX. The library includes routines to perform functions such as handling mailboxes, converting

FLICENSE MANAGEMENT FACILITY SUPPORT

Fdata from one type to another, and returning device/file

information.

This layered product supports the VMS License

Management Facility. License units for this product are

FHARDWARE REQUIREMENTS

Fallocated on a CPU-capacity basis.

VAX, MicroVAX, or VAXstation configuration as specified

For more information on the License Management in the System Support Addendum (SSA 25.49.14-x).

Facility, refer to VMS Operating System Software Product

FSOFTWARE REQUIREMENTS*

FDescription (SPD 25.01.xx) or the License Management

Facility of the VMS Operating System documentation set.

VMS Operating System

FFor VAXstation Systems:

Fpolicies, contact your local Digital office.

VMS Workstation Software

FSOFTWARE PRODUCT SERVICES

F*Refer to the System Support Addendum (SSA 25.49.14-

A variety of service options are available. For more inforx) for availability and required versions of prerequisite/ mation on these or other services, contact your local optional software.

Digital office.

FORDERING INFORMATION

SOFTWARE WARRANTY

FSoftware Licenses: QL-018A*-**

Warranty for this software product is provided by Digital

Software Media: QA-018A*-** with the purchase of a license for the product as defined

Software Documentation: QA-018AA-GZ in the Software Warranty Addendum of this SPD.

Software Product Services: QT-018A*-**

F__________________

F� The DIGITAL Logo is a registered trademark of Digital Equipment Corporation.

F� VAX, VMS, MicroVAX, VAXstation, and Ethernet are trademarks of Digital Equipment Corporation. F2