dt XX-XXXXX-XXBefore You Install VAX ACMS Version 3.2: ADDENDUM1. If you are installing either an ACMS Version 3.2 Development or Run-Time-Only

kit for the �rst time on a system with CDD/Plus already installed, you must manually create a CDD/Plus directory for ACMS before you start the installation procedure.

To manually create the CDD/Plus directory for ACMS, log into the SYSTEM account, invoke the DMU utility, and create the directory as follows:$ RUN SYS$SYSTEM:DMU

                                 Return DMU> CREATE/AUDIT CDD$TOP.ACMS$DIR
                                                  Return If you do not manually create this CDD/Plus directory, then the installation pro-

cedure will fail with the following error:-CDD-E-NODNOTFND, directory or object not found

2. ACMS Version 3.2 requires VMS DECdtm transaction services Version 1.1-2 or higher. Because the required version of VMS DECdtm transaction services may not be included in your existing VMS kit, the ACMS Version 3.2 installation procedure installs the correct version of VMS DECdtm transaction services when you install ACMS.

If you upgrade VMS after installing ACMS Version 3.2, you may need to re-install ACMS Version 3.2 to obtain the correct version of the VMS DECdtm transaction services. To determine if you need to re-install ACMS Version 3.2 after upgrading VMS, log into the SYSTEM account and obtain the version of the VMS DECdtm

transaction services by entering:$ ANALYZE/IMAGE SYS$LOADABLE_IMAGES:SYS$TRANSACTION_SERVICES

Return The version of the VMS DECdtm transaction services is displayed in the "Image

Identi�cation Information" section, as follows:Image Identification Information

     image name: "SYS$TRANSACTION_SERVICES"
     image file identification: "DECDTM V1.1-2"
.
.
.' Digital Equipment Corporation. 1991. All rights reserved.