dt Read Before Installing or Using ALL-IN-1 PC Server for VMS Version 1.0 AV-PAG6A-TEThe ALL-IN-1 PC Server for VMS (ALL-IN-1 PC Server) is a collection of executable images, DCL command procedures, ALL-IN-1 scripts, and data �les. It allows an ALL-IN-1 system to be used as a server for various PC clients.

Whether you are a new or a continuing ALL-IN-1 PC Server customer, please take time to read the following information about your product.

Installation Information

ALL-IN-1 PC Server Version 1.0 requires VMS Version 5.0-2 or higher. ALL- IN-1 Version 2.3 software or higher must be installed on the VAX computer on which you are installing this product.

Release Notes Information

The release notes for ALL-IN-1 PC Server Version 1.0 contain important installation and system management-related instructions and a summary of known problems, corrected errors, performance enhancements, documentation errors, restrictions, and incompatibilities.

Read the release notes before installing ALL-IN-1 PC Server by invoking VMSINSTAL and following the instructions that start the installation procedure. Specify Option N to display the release notes option.

Contents of This Kit

Indented Bill Report (BIL) and Bill of Materials (BOM)

Please read the BIL and BOM enclosed in this kit and check to see that all items listed are actually in your kit. If your kit is damaged or any items are missing, call your Digital representative.

Media

If you ordered media, you will �nd the media and the ALL-IN-1 PC Server for VMS Installation Guide in this kit. Consult the ALL-IN-1 PC Server for VMS Installation Guide for information about installing ALL-IN-1 PC Server on your system.

Documentation

Depending on your order, this kit may include copies of the following ALL-IN-1 PC Server documentation:

ALL-IN-1 DESKtop for PCs Management Guide ALL-IN-1 DESKtop for PCs Programmer’s Reference Manual ALL-IN-1 DESKtop for DOS User’s Guide1

' Digital Equipment Corporation 1990. All rights reserved.

Note that the ALL-IN-1 PC Server for VMS Installation Guide is included with the media.

Software Product Description (SPD) The SPD provides an overview of the ALL-IN-1 PC Server kit and its features.

Software Performance Report (SPR) Use this form to report any problems with ALL-IN-1 PC Server, provided you have purchased warranty services.

A Final Note

Digital prides itself on responding to customer needs. In order to continue serving you, we need your comments. Each manual contains preaddressed, postage-paid Reader’s Comments forms at the back. If you �nd errors in a manual or want to make comments about it, please �ll out one of these forms and send it to us.